From cf343bdeafb890e89796e55553a7c3fd57fc9342 Mon Sep 17 00:00:00 2001
From: Sadie Powell
Date: Thu, 4 Mar 2021 01:30:21 +0000
Subject: Use InnoDB instead of the deprecated MyISAM in the sqloper table.

---
 docs/sql/sqloper.mysql.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/sql/sqloper.mysql.sql')

diff --git a/docs/sql/sqloper.mysql.sql b/docs/sql/sqloper.mysql.sql
index a8a2b7e1d..83dfa68a6 100644
--- a/docs/sql/sqloper.mysql.sql
+++ b/docs/sql/sqloper.mysql.sql
@@ -9,4 +9,4 @@ CREATE TABLE ircd_opers (
   autologin tinyint(1) NOT NULL DEFAULT 0,
   active tinyint(1) NOT NULL DEFAULT 1,
   PRIMARY KEY  (id)
-) ENGINE=MyISAM;
+) ENGINE=InnoDB;
-- 
cgit v1.3.1-10-gc9f91

