From f2acdbc3820f0f4f5ef76a0a64e73d2a320df91f Mon Sep 17 00:00:00 2001
From: peavey
Date: Mon, 16 Jul 2007 17:30:04 +0000
Subject: OOPS! We try again, since I'm smoking craq. LF is 0x0a NOT CR.

git-svn-id: http://svn.inspircd.org/repository/trunk/inspircd@7456 e03df62e-2008-0410-955e-edbf42e46eb7
---
 extras/m_sqllog.postgresql.sql | 52 +++++++++++++++++++++++++++++++++++++++++-
 1 file changed, 51 insertions(+), 1 deletion(-)

(limited to 'extras/m_sqllog.postgresql.sql')

diff --git a/extras/m_sqllog.postgresql.sql b/extras/m_sqllog.postgresql.sql
index 561dba16d..2e40dd90d 100644
--- a/extras/m_sqllog.postgresql.sql
+++ b/extras/m_sqllog.postgresql.sql
@@ -1 +1,51 @@
---
-- PostgreSQL database dump
--

CREATE TABLE ircd_log (
    id serial NOT NULL,
    category_id bigint,
    nick bigint,
    host bigint,
    source bigint,
    dtime bigint DEFAULT 0 NOT NULL
);
ALTER TABLE ONLY ircd_log
    ADD CONSTRAINT ircd_log_pkey PRIMARY KEY (id);



CREATE TABLE ircd_log_actors (
    id serial NOT NULL,
    actor text
);
ALTER TABLE ONLY ircd_log_actors
    ADD CONSTRAINT ircd_log_actors_pkey PRIMARY KEY (id);



CREATE TABLE ircd_log_categories (
    category_id serial NOT NULL,
    category text NOT NULL
);

INSERT INTO ircd_log_categories VALUES (1, 'Oper');
INSERT INTO ircd_log_categories VALUES (2, 'Kill');
INSERT INTO ircd_log_categories VALUES (3, 'Server Link');
INSERT INTO ircd_log_categories VALUES (4, 'G/Z/K/E Line');
INSERT INTO ircd_log_categories VALUES (5, 'Connect');
INSERT INTO ircd_log_categories VALUES (6, 'Disconnect');
INSERT INTO ircd_log_categories VALUES (7, 'Flooding');
INSERT INTO ircd_log_categories VALUES (8, 'Load Module');

ALTER TABLE ONLY ircd_log_categories
    ADD CONSTRAINT ircd_log_categories_pkey PRIMARY KEY (category_id);



CREATE TABLE ircd_log_hosts (
    id serial NOT NULL,
    hostname text
);
ALTER TABLE ONLY ircd_log_hosts
    ADD CONSTRAINT ircd_log_hosts_pkey PRIMARY KEY (id);
\ No newline at end of file
+--
+-- PostgreSQL database dump
+--
+
+CREATE TABLE ircd_log (
+    id serial NOT NULL,
+    category_id bigint,
+    nick bigint,
+    host bigint,
+    source bigint,
+    dtime bigint DEFAULT 0 NOT NULL
+);
+ALTER TABLE ONLY ircd_log
+    ADD CONSTRAINT ircd_log_pkey PRIMARY KEY (id);
+
+
+
+CREATE TABLE ircd_log_actors (
+    id serial NOT NULL,
+    actor text
+);
+ALTER TABLE ONLY ircd_log_actors
+    ADD CONSTRAINT ircd_log_actors_pkey PRIMARY KEY (id);
+
+
+
+CREATE TABLE ircd_log_categories (
+    category_id serial NOT NULL,
+    category text NOT NULL
+);
+
+INSERT INTO ircd_log_categories VALUES (1, 'Oper');
+INSERT INTO ircd_log_categories VALUES (2, 'Kill');
+INSERT INTO ircd_log_categories VALUES (3, 'Server Link');
+INSERT INTO ircd_log_categories VALUES (4, 'G/Z/K/E Line');
+INSERT INTO ircd_log_categories VALUES (5, 'Connect');
+INSERT INTO ircd_log_categories VALUES (6, 'Disconnect');
+INSERT INTO ircd_log_categories VALUES (7, 'Flooding');
+INSERT INTO ircd_log_categories VALUES (8, 'Load Module');
+
+ALTER TABLE ONLY ircd_log_categories
+    ADD CONSTRAINT ircd_log_categories_pkey PRIMARY KEY (category_id);
+
+
+
+CREATE TABLE ircd_log_hosts (
+    id serial NOT NULL,
+    hostname text
+);
+ALTER TABLE ONLY ircd_log_hosts
+    ADD CONSTRAINT ircd_log_hosts_pkey PRIMARY KEY (id);
-- 
cgit v1.3.1-10-gc9f91

