From f2acdbc3820f0f4f5ef76a0a64e73d2a320df91f Mon Sep 17 00:00:00 2001
From: peavey
Date: Mon, 16 Jul 2007 17:30:04 +0000
Subject: OOPS! We try again, since I'm smoking craq. LF is 0x0a NOT CR.

git-svn-id: http://svn.inspircd.org/repository/trunk/inspircd@7456 e03df62e-2008-0410-955e-edbf42e46eb7
---
 extras/m_sqloper.mysql.sql | 25 ++++++++++++++++++++++++-
 1 file changed, 24 insertions(+), 1 deletion(-)

(limited to 'extras/m_sqloper.mysql.sql')

diff --git a/extras/m_sqloper.mysql.sql b/extras/m_sqloper.mysql.sql
index ee993c771..293a2aa70 100644
--- a/extras/m_sqloper.mysql.sql
+++ b/extras/m_sqloper.mysql.sql
@@ -1 +1,24 @@
--- MySQL dump 9.11
--
-- Host: localhost    Database: brain
-- ------------------------------------------------------
-- Server version	4.0.20

--
-- Table structure for table `ircd_opers`
--

CREATE TABLE ircd_opers (
  id bigint(20) NOT NULL auto_increment,
  username text,
  password text,
  hostname text,
  type text,
  PRIMARY KEY  (id)
) TYPE=MyISAM;

--
-- Dumping data for table `ircd_opers`
--


\ No newline at end of file
+-- MySQL dump 9.11
+--
+-- Host: localhost    Database: brain
+-- ------------------------------------------------------
+-- Server version	4.0.20
+
+--
+-- Table structure for table `ircd_opers`
+--
+
+CREATE TABLE ircd_opers (
+  id bigint(20) NOT NULL auto_increment,
+  username text,
+  password text,
+  hostname text,
+  type text,
+  PRIMARY KEY  (id)
+) TYPE=MyISAM;
+
+--
+-- Dumping data for table `ircd_opers`
+--
+
+
-- 
cgit v1.3.1-10-gc9f91

